IF NOT EXISTS(SELECT 1 FROM [dbo].[fabricante] WHERE [idfabricante] = 222)
BEGIN
	INSERT INTO [dbo].[fabricante] ([IDFABRICANTE],[DESCRICAO]) VALUES (222, N'VOLTZ');
END