﻿IF NOT EXISTS(SELECT 1 FROM [dbo].[fabricante] WHERE [idfabricante] = 255)
BEGIN
	INSERT INTO [dbo].[fabricante] ([idfabricante],[descricao]) VALUES (255, N'WATTS');
END
